Copyright: (c) Hewlett-Packard


Reinstalling FP
Reinstalling the front panel assembly.

1-  Insert the bottom of the assembly into the two indicated notches, inside the right end cover. Then firmly reinsert the top two tabs.

Push the front panel from the outside, to check whether it is correctly installed.