Copyright: (c) Hewlett-Packard


Remove right cover & FP
Removing the right end cover and the front panel.

1- Remove the pinch-wheel lever and screw.

2- Pull the plotter on/off switch out of the end-cover.

3- Release the three clips at the bottom of the end-cover: first the side clip, them the front and back clips.

  These may be stiff.

_________________________________________________________________________________________

CAUTION

In the following step, be careful not to damage the two electronic cables attached inside the end-cover

_________________________________________________________________________________________

4- Pull the end-cover up.

5- Inside the end-cover, press the two indicated tabs towards each other, and remove the front-panel assembly from the end-cover.

6- To be able to easily use the front panel, when the right end-cover has been removed, slide the front-panel assembly onto the metal base of the plotter as shown.