Copyright: (c) Hewlett-Packard


Remove Top Cover
Removing the Top Cover

1- Open the top cover.

2- Push the right-hand side of the cover slightly back, so that the rightmost hinge uncouples.

3- Slide the cover to the left, so that the other hinges uncouple.

Reassembling:

Close the cover, and click each hinge into place.

4- Remove the cover from the plotter.