This program will verify your CD-ROM System Configuration by analyzing your
CONFIG.SYS and AUTOEXEC.BAT files, and, if necessary, allow you to modify and
add the required lines to these files.  It will also perform various other 
tests as required by your CD-ROM drive.
     
If problems are detected, you will see a window pop up and you may be prompted 
for additional information;  the program will then ask for confirmation 
before updating CONFIG.SYS and AUTOEXEC.BAT, and, if necessary, the Windows 
SYSTEM.INI

The basis for this program is to help you get your CD-ROM drive operating.
However there are some circumstances that a program can not check for. If
this is the first installation of this kit, it is possible that a cable is 
incorrectly attached or not connected.  Check all the cabling before
changing the default settings in this program.

This program may give the impression that the drivers in the CONFIG.SYS 
& AUTOEXEC.BAT are incorrect, however, there may be nothing wrong with the 
driver's parameters, but the drivers are not loading for a some other reason 
(ie: cabling problems): this may be why this program ran automatically. If 
you have a customized menu or multiple boot configurations, this may cause 
the drivers not to load, and thus cause CD-ROM related problems.  You may 
have to manually edit the system files and move the drivers to a location 
where they can load.
  
As you wander through this program, please read all of the information 
carefully.  The solution to your problem may be as simple as a cable 
connection or as complicated as an address or IRQ conflict.  Read everything 
carefully, your problem may not stand out when your come across it.

Press the ESC key to return to the main menu
