This program will verify the CDROM Interface by examining the 
following components:

	find and analyze DEVICE= in CONFIG.SYS
	find and analyze MSCDEX.EXE in AUTOEXEC.BAT
	verify residence CDROM Device Driver 
	verify residence MSCDEX Device Driver 

Press the F1 key to bring up this screen.
Press the F3 key to exit the program.

Use the Arrow Keys to move the highlighted cursor, press ENTER to select.

Press ESCAPE to cancel data editing or to exit some menus.

	
	
