This program will verify the Digital Audio Interface by examining the 
following components:

	find and analyze DEVICE= in CONFIG.SYS
	find and analyze AUTOEXEC.BAT SET and TSR
	verify Mixer Device Driver Residence
	verify VBEAI Device Driver Residence

Press the F1 key to bring up this screen.
Press the F3 key to exit the program.

Use the Arrow Keys to move the highlighted cursor, press ENTER to select.

Press ESCAPE to cancel data editing or to exit some menus.

Press '!' (Shift 1) to get a DOS Command Shell.	
Press '@' (Shift 2) to restore the screen.
To Print the Screen, press CTRL-P, then 1 or 2 for LPT1 or 2.
	
	
