Översikt
Hjälp för Intel(R) Application Accelerator

Översikt

Intel(R) Application Accelerator är ett desktopbaserat programvarupaket som utvecklats speciellt för att öka prestanda hos program och datorer som använder Intel(R) Pentium(R) III- eller Pentium(R) 4-processorer. Detta uppnås med hjälp av flera metoder:

1.	Intel Application Accelerator Driver - denna teknik ökar prestanda hos Input/Output-delsystemets överföringshastighet och förbättrar på så sätt systemets hastighet avsevärt.

2.	Intel(R) Advanced Pre-Fetch Modul - denna teknik, som finns tillgänglig för system för Pentium(R) 4-processorer som endast använder Microsoft* Windows* 2000 Professional och Windows XP, förverkligar en genomgående förbättring av prestanda för Windows 2000 och Windows XP -baserade program.

Programvaruinstallationen är flexibel och helt automatiserad för Microsoft* Windows* 98, Windows 98 Second Edition (SE), Windows Millennium Edition (Me), Windows NT* 4.0, Windows 2000 Professional, samt operativsystemen för Windows XP Home Edition och Professional.

*  andra märken och namn kan göras anspråk på som andras egendom.


Systemkrav
Hjälp för Intel(R) Application Accelerator

Systemkrav:

Innan du kan använda Intel(R) Application Accelerator måste följande systemkrav uppfyllas:

Desktopbaserat eller mobilbaserat datasystem

Intel(R) Celeron(R)-, Pentium(R) II-, Pentium(R) III- eller Pentium(R) 4-processor

Intel 800-seriens kretsuppsättning

Minst 32 MB fysiskt minne

IDE-hårddisk

Microsoft* Windows* 98, Windows 98 Second Edition (SE), Windows Millennium Edition (Me), Windows NT*4.0 (Service Pack 3.0 eller senare), Windows 2000 Professional, Windows XP Home Edition eller Windows XP Professional.

Operativsystem som inte kan användas:

Microsoft Windows 3.1 eller versioner därav

Microsoft Windows 95 eller versioner därav

Microsoft Windows NT 3.51 (inklusive service pack) eller version därav

Microsoft Windows 2000 Server, Windows 2000 Advanced Server och Windows 2000 Data center Server

Microsoft Windows XP Server, Windows XP Advanced Server och Windows XP Data center Server

Linux*

UNIX*

BeOS*

MacOS*

OS/2* (ingen version)

MS-DOS*

*  andra märken och namn kan göras anspråk på som andras egendom.


Allmänna funktioner
Hjälp för Intel(R) Application Accelerator

Allmänna funktioner:

För Intel(R) Application Accelerator finns följande funktioner tillgängliga på egenskapssidor:

Information om enhet - denna sida finns tillgänglig för alla matchande systemkonfigurationer och visar information som skapats och följt med från Intel(R) Application Accelerator. Olika parametrar ses ge information om datorns IDE-enhet(er), överföringshastigheter och styrenhetsversioner.

Rapport - denna sida finns tillgänglig för alla matchande systemkriterier och visar en rapport, för support, om information som är relevant för IDE-styrenheten, IDE-kanalen och IDE-enheten/-enheterna.  Rapporten kan också skrivas ut, sparas som en textfil och visas i en extern vy.

Support - denna sida finns tillgänglig för alla matchande systemkriterier och visar supportinformation som t.ex. webbsidor och strängtext för information såväl som annan information som är relevant för support för produkten.

*  andra märken och namn kan göras anspråk på som andras egendom.


Komponentöversikt: Intel Application Accelerator Driver
Hjälp för Intel(R) Application Accelerator

Komponentöversikt: Intel(R) Application Accelerator Driver

Intel(R) Application Accelerator är en certifierad komponent från Windows* Hardware Quality Labs <http://www.microsoft.com/hwtest/default.asp> (WHQL) som utvecklats speciellt för att öka hastigheten för disk till systemets delsystem.

Intel(R) Application Accelerator kan ifrågasätta lagringskomponenten via ett IOCTL-gränssnitt och erhålla detaljerad information om Ultra ATA-styrenheten som visas på sidan  Enhetsinformation/Egenskaper. Denna information kan sedan  sparas till fil och visas på sidan Rapport.

Som ytterligare supplement finns en uppdateringsfunktion för att uppdatera egenskapssidan Enhetsinformation när enheter byts ut under mobil konfigurering. Uppdateringsfunktionen kan aktiveras genom att trycka på tangenten “F5” eller genom att klicka på menyn “Visa” och sedan välja ”Uppdatera”.

*  andra märken och namn kan göras anspråk på som andras egendom.


Komponentöversikt: Visar information om styrenhet och enhet
Hjälp för Intel(R) Application Accelerator

Komponentöversikt: Visar information om styrenhet och enhet

När fönstret Enheter på sidan Enhetsinformation öppnas innehåller det poster för Intel Application Accelerator Driver och alla anslutna ATA/ATAPI-enheter. Genom att välja en speciell styrenhet eller enhet i fönstret Enheter visar programmet motsvarande konfigurationsparametrar i fönstret Information om enhet. Parametrar som visas som en ikon för ett oscilloskop är skrivskyddade; parametrar med en nyckelikon kan ändras. På nästa skärm beskrivs de olika parametrarna:

Parametrar för styrenheten

Namn	Beskrivning
Lagringssats installerad	Intel(R) Application Accelerator produktversion
Version av drivrutin	Enhetens drivrutinsversion
VxD-kompilering (1)	Produktnamn för VSD-enhetens drivrutin
VxD-version (1)	VSD-enhetens drivrutinsversion
Stöd för PIO-läge	PIO-lägen som stöds av styrenheten
Stöd för DMA SW-läge	Single-word DMA-lägen som stöds av styrenheten
Stöd för DMA MW-läge	Multi-word DMA-lägen som stöds av styrenheten
Stöd för UDMA-läge	Ultra DMA-lägen som stöds av styrenheten

Enhetsparametrar

Namn	Beskrivning
Inbyggd programvara	Revidering av enhetens inbyggda programvara
Serienummer	Enhetens serienummer
Stöd för PIO-läge	PIO-lägen som stöds av enheten
Stöd för DMA SW-läge	Single-word DMA-lägen som stöds av enheten
Stöd för DMA MW-läge	Multi-word DMA-lägen som stöds av enheten
Stöd för UDMA-läge	Ultra DMA-lägen som stöds av enheten
Diskutrymme (2)	Diskens totala utrymme
Aktuellt överföringsläge	Enhetens aktuella, konfigurerade överföringsläge
Gräns för överföringsläge	Används för att begränsa aktuellt överföringsläge till en enhet som är ansluten till den kabelplatsen.
Kabeltyp (värd)	Meddelar om system-BIOS känner igen enheten som är ansluten till en 40- eller 80-ledarkabel av ATA-typ.
Autoakustisk hantering	Styr den brusnivå som associeras med disken.
Dynamisk APM på Växelström	Styr hårddiskens förmåga att hantera sina egna strömnivåer på växelström (exempelvis system som är inkopplat till vägguttag).
Dynamisk APM på Batteri	Styr hårddiskens förmåga att hantera sina egna strömnivåer på batteriström.
(1) Denna parameter visas bara i Microsoft* Windows* 98, Windows 98 Second Edition (SE) och Windows Millennium Edition (Me).

(2) Denna parameter visas bara på enheter som uppfyller ATA-specifikationen.


Parametrar som kan modifieras av användare
Hjälp för Intel(R) Application Accelerator

Parametrar som kan modifieras av användare

I fönstret Parametrar på egenskapssidan Enhetsinformation finns vissa parametrar som kan modifieras. Om du vill ändra en markerad parameter, markera den enhet som du vill modifiera i fönstret Enheter. Motsvarande tillgängliga parametrar visas till höger i fönstret Parametrar.

Dubbelklicka med vänsterknappen på den grå tångikonen som är associerad med den modifierbara parametern. Då visas dialogrutan “Redigera värde”. Klicka på pil ner och välj önskat alternativ.

Om "Gräns för överföringsläge" modifieras måste sedan systemet startas igen.

Modifierbara parametrar:

Gräns för överföringsläge

PIO-0, PIO-2, PIO-3, PIO-4

Programmed Input/Output (PIO) – överföringshastighet för äldre enheter

DMA MW-1, DMA MW-2

DMA Multi-Word (MW) – överföringshastighet för äldre enheter

UDMA-0, UDMA-1, UDMA-2, UDMA-3, UDMA-4, UDMA-5

Ultra DMA (UDMA) – överföringshastighet för aktuella enheter. UDMA-5 motsvarar ATA-100

Ingen gräns

Aktiverar snabbaste överföringsläge som stöds av enheten

Autoakustisk hantering (1)

Maximal prestanda

Bästa enhetsprestanda med Autoakustisk hantering aktiverat

Tillverkarens standardvärde, [värde]

Tillverkares rekommenderade inställningar för optimal brusnivå. Enhetstillverkaren kan inte tillhandahålla standardvärde

Minimal akustisk utmatning

Minimalt hörbar brusnivå

Inaktiverad

Bästa enhetsprestanda utan Autoakustisk hantering aktiverat. Denna markering är snabbare än markeringen 'Maximal prestanda'

Dynamisk APM på Växelström

Maximal prestanda

Bästa enhetsprestanda med Dynamisk APM aktiverat när systemet körs på växelström (exempelvis system som är inkopplat till vägguttag).

Minimal energiförbrukning utan viloläge

Enligt beskrivningen

Minimal energiförbrukning med viloläge

Enligt beskrivningen

Inaktiverad

Bästa enhetsprestanda utan Dynamisk APM aktiverat på växelström. Denna markering är snabbare än markeringen 'Maximal prestanda'

Dynamisk APM på Batteri

Maximal prestanda

Bästa enhetsprestanda med Dynamisk APM aktiverat när systemet körs på batteriström.

Minimal energiförbrukning utan viloläge

Enligt beskrivningen

Minimal energiförbrukning utan viloläge

Enligt beskrivningen

Inaktiverad

Bästa enhetsprestanda utan Dynamisk APM aktiverat på Batteriström. Denna markering är snabbare än markeringen 'Maximal prestanda'

(1) Minskning av enhetens brusnivå åstadkommes genom att minska sökhastigheter vilket kan orsaka något av en försämring i prestanda.