Visão geral
Ajuda do Intel(R) Application Accelerator

Visão geral

O Intel(R) Application Accelerator é um pacote de software para micros de secretária projectado especificamente para aumentar o desempenho das aplicações e dos sistemas de computadores que utilizam o processador Intel(R) Pentium(R) III ou Pentium(R) 4. Isto é atingido pelo uso de diversos métodos:

1.	Intel(R) Application Accelerator Driver - Esta tecnologia aumenta o desempenho da taxa de transferência do subsistema de Entrada/Saída, melhorando consideravelmente a velocidade do sistema.

2.	Módulo Intel(R) Advanced Pre-Fetch - Com esta tecnologia, disponível para sistemas com base no processador Pentium(R) 4 que executam apenas o Microsoft* Windows* 2000 Professional e Windows XP, é notada uma melhora adicional de desempenho total nas aplicações com base em Windows 2000.

A instalação do software é flexível e completamente automatizada para os sistemas operativos Microsoft* Windows* 98, Windows 98 Second Edition (SE), Windows Millennium Edition* (Me), Windows NT* 4.0, Windows 2000 Professional e Windows XP Home Edition e Professional.

* outras marcas e nomes podem ser propriedade de outras empresas.


Requisitos do sistema
Ajuda do Intel(R) Application Accelerator

Requisitos do sistema:

Para utilizar o Intel(R) Application Accelerator, devem ser considerados os seguintes requisitos do sistema:

Sistema de computador para secretária ou portátil

Processador Intel(R) Pentium(R) III ou Pentium(R) 4

Família de chipset Intel(R) da Série 800

Memória física de 32 MB, no mínimo

Disco rígido IDE

Microsoft* Windows* 98, Windows 98 Second Edition (SE), Windows Millennium Edition (Me), Windows NT*4.0 (Service Pack 3.0 e superior), Windows 2000 Professional, Windows XP Home Edition ou Windows XP Professional.

Sistemas operativos não suportados:

Qualquer versão do Microsoft Windows 3.1

Qualquer versão do Microsoft Windows 95

Qualquer versão (incluindo o service pack) do Microsoft Windows NT 3.51

Microsoft Windows 2000 Server, Windows 2000 Advanced Server e Windows 2000 Data center Server

Microsoft Windows XP Server, Windows XP Advanced Server e Windows XP Data center Server

Linux*

UNIX*

BeOS*

MacOS*

OS/2* (qualquer versão)

MS-DOS

* outras marcas e nomes podem ser propriedade de outras empresas.


Recursos gerais
Ajuda do Intel(R) Application Accelerator

Recursos gerais:

O Intel(R) Application Accelerator tem os seguintes recursos disponíveis nas páginas de propriedades:

Informação sobre o Dispositivo - Esta página de propriedades, disponível para todas as configurações do sistema correspondentes, exibe as informações geradas e passadas do componente Intel(R) Application Accelerator Driver. Diversos parâmetros são vistos dando informações sobre a(s) unidade(s) IDE do computador, taxas de transferência e versões do controlador.

Relatório - Esta página de propriedades, disponível para todos os critérios do sistema correspondente, exibe um relatório para fins de suporte sobre as informações relevantes para o(s) controlador(es) IDE, o canal IDE e a unidade IDE. Este relatório também pode ser impresso, gravado como ficheiro de texto e visualizado num visualizador externo.

Suporte - Esta página de propriedades, disponível para todos os critérios do sistema correspondente, exibe as informações de suporte, como sites Web de suporte e diversas sequências de texto para informação, bem como qualquer outra informação relevante para suporte do produto.

* outras marcas e nomes podem ser propriedade de outras empresas.


Visão geral do componente: Intel Application Accelerator Driver
Ajuda do Intel(R) Application Accelerator

Visão geral do componente: Intel(R) Application Accelerator Driver

A Intel(R) Application Accelerator Driver Technology é um componente certificado pelos Windows* Hardware Quality Labs <http://www.microsoft.com/hwtest/default.asp> (WHQL), projectado especificamente com a intenção de aumentar a velocidade do disco para o subsistema do sistema.

O Intel(R) Application Accelerator tem a capacidade de consultar o componente de armazenamento através de uma interface IOCTL e obter informações detalhadas sobre o dispositivo e o Ultra ATA Controller, exibidas na Guia Informações do Dispositivo/Página de propriedades, que podem ser gravadas em um arquivo e exibidas na Guia Relatório/Página de propriedades.

Além disso, uma função de actualização pode ser utilizada para actualizar a Página de propriedades de informações do dispositivo quando os dispositivos são enviados para as configurações móveis. A função Actualizar pode ser activada pressionando a tecla de função F5 do teclado ou clicando no menu em “Ver” e, a seguir, em “Actualizar”.

* outras marcas e nomes podem ser propriedade de outras empresas.


Visão geral: Exibindo as informações do dispositivo e do controlador
Ajuda do Intel(R) Application Accelerator

Visão geral do componente: Exibindo as informações do dispositivo e do controlador

Quando aberta, a janela Dispositivos na Guia Informação sobre o dispositivo/Página de Propriedades contém entradas do controlador Intel(R) Application Accelerator e de todos os dispositivos ATA/ATAPI conectados. A selecção de um determinado controlador ou dispositivo na janela Dispositivos faz com que a aplicação exiba os parâmetros de configuração correspondentes na janela Informação sobre o dispositivo. Os parâmetros mostrados com o ícone osciloscópio são apenas de leitura; os parâmetros mostrados com o ícone chave inglesa são para leitura e gravação. Os diversos parâmetros estão descritos a seguir, no próximo ecrã:

Parâmetros do controlador:

Nome	Descrição
IDE Controller	Nome do produto do controlador
Kit de Armazenamento instalado	Versão do produto Intel® Application Accelerator
Versão do driver	Versão do driver do dispositivo
VxD Build (1)	Nome do produto do driver do dispositivo VSD
VxD Versão (1)	Versão do driver do dispositivo VSD
Suporte do Modo PIO	Modos PIO suportados pelo controlador
Suporte do Modo DMA SW	Modos DMA com uma palavra suportados pelo controlador
Suporte do Modo DMA MW	Modos DMA com diversas palavras suportados pelo controlador
Suporte do Modo UDMA	Modos Ultra DMA suportados pelo controlador
Parâmetros do dispositivo:

Nome	Descrição
Firmware	Revisão do firmware do dispositivo
Número de série	Número de série do dispositivo
Suporte do Modo PIO	Modos PIO suportados pelo dispositivo
Suporte do Modo DMA SW	Modos DMA com uma palavra suportados pelo dispositivo
Suporte do Modo DMA MW	Modos DMA com diversas palavras suportados pelo dispositivo
Suporte do Modo UDMA	Modos Ultra DMA suportados pelo dispositivo
Tamanho do disco (2)	Tamanho total do disco
Modo de transferência actual	Modo de transferência actual configurado do dispositivo
Limite do modo de transferência	Utilizado para limitar o Modo de transferência actual, aplica-se a qualquer dispositivo conectado àquela posição de cabo
Tipo de cabo (Host)	Relata se a BIOS do sistema reconhece que o dispositivo está conectado por um cabo condutor ATA 80
Gestão Acústica Automática	Controla o nível de ruído associado ao disco
Gestão Avançada de Energia	Controla a capacidade do disco para gerir os seus níveis de energia
(1) Este parâmetro aparece apenas no Microsoft* Windows* 98, Windows 98 Second Edition (SE) e no Windows Millennium Edition (Me).

(2) Este parâmetro aparece apenas nos dispositivos que estão de acordo com a especificação ATA.


Parâmetros Modificáveis pelo Utilizador
Ajuda do Intel(R) Application Accelerator

Parâmetros Modificáveis pelo Utilizador

Localizados na janela Parâmetros da página de propriedades Informação sobre o Dispositivo estão parâmetros que são passíveis de modificação. Para alterar o parâmetro seleccionado, seleccione o dispositivo que pretende modificar na janela Dispositivos. Os parâmetros disponíveis correspondentes serão apresentados à direita da janela Parâmetros.

Faça duplo clique com o botão esquerdo no ícone cinzento da chave inglesa associado ao parâmetro a modificar. Aparece a caixa de diálogo “Editar Valor”. Clique na seta de deslocamento para baixo e seleccione a opção pretendida.

Se 'Limite do Modo de Transferência' for modificado, o sistema terá de ser reiniciado.

Parâmetros Modificáveis:

Limite do Modo de Transferência

PIO-0, PIO-2, PIO-3, PIO-4

Entrada/Saída Programada (PIO) – Taxa de transferência para dispositivos antigos

DMA MW-1, DMA MW-2

DMA Multi-Palavras (MW) – Taxa de transferência para dispositivos antigos

UDMA-0, UDMA-1, UDMA-2, UDMA-3, UDMA-4, UDMA-5

Ultra DMA (UDMA) – Taxa de transferência para dispositivos actuais. UDMA-5 equivale a ATA-100

Sem Limite

Disponibiliza o modo de transporte mais rápido suportado pelo dispositivo

Gestão Acústica Automática (1)

Desempenho Máximo

O melhor desempenho da unidade com a Gestão Acústica Automática activada

Valor de Fábrica, [valor]

As definições recomendadas pelo fabricante para nível de ruído óptimo. O fabricante do dispositivo pode não disponibilizar um valor predefinido

Saída Acústica Mínima

Nível de ruído audível mínimo

Desactivado

Melhor desempenho da unidade com a Gestão Acústica Automática activada. Esta selecção é mais rápida do que a selecção 'Desempenho Máximo'

Gestão Avançada de Energia

Desempenho Máximo

Melhor desempenho da unidade com a Gestão Avançada de Energia activada

Consumo Mínimo de Energia sem Espera

Como descrito

Consumo Mínimo de Energia com Espera

Como descrito

Desactivado

Melhor desempenho da unidade com a Gestão Avançada de Energia activada. Esta selecção é mais rápida do que a selecção 'Desempenho Máximo'

(1) A redução do nível de ruído do dispositivo é conseguida pela redução das taxas de pesquisa, facto que pode causar uma ligeira degradação do desempenho.