Περίληψη
Βοήθεια για το Intel(R) Application Accelerator

Περίληψη

Το Intel(R) Application Accelerator είναι ένα λογισμικό πακέτο βασισμένο σε επιφάνεια εργασίας και ειδικά σχεδιασμένο να αυξάνει την απόδοση των εφαρμογών και των υπολογιστικών συστημάτων που εκτελούνται σε επεξεργαστή Pentium(R) III ή Pentium(R) 4 της Intel(R). Αυτό επιτυγχάνεται με τη χρήση αρκετών μεθόδων:

1.	Η τεχνολογία Intel(R) Application Accelerator Driver - Η τεχνολογία αυτή αυξάνει την απόδοση της ταχύτητας μεταφοράς του υποσυστήματος εισόδου/εξόδου, ενισχύοντας σημαντικά την ταχύτητα του συστήματος.

2.	Λειτουργική μονάδα Intel(R) Advanced Pre-Fetch - Με την τεχνολογία αυτή, η οποία διατίθεται μόνο σε συστήματα με επεξεργαστή Pentium(R) 4 που εκτελούν Microsoft* Windows* 2000 Professional και Windows XP, επιτυγχάνεται μια συνολική, πρόσθετη ενίσχυση στην απόδοση εφαρμογών που βασίζονται σε Windows 2000.

Η εγκατάσταση του λογισμικού είναι ευέλικτη και πλήρως αυτοματοποιημένη για τα λειτουργικά συστήματα Microsoft* Windows* 98, Windows 98 Second Edition (SE), Windows Millennium Edition (Me), Windows NT* 4.0, Windows 2000 Professional και Windows XP Home Edition και Professional.

*  λοιπά εμπορικά σήματα και επωνυμίες ενδέχεται να διεκδικηθούν ως ιδιοκτησία τρίτων.


Απαιτήσεις συστήματος:
Βοήθεια για το Intel(R) Application Accelerator

Απαιτήσεις συστήματος:

Προκειμένου να χρησιμοποιήσετε το Intel(R) Application Accelerator πρέπει να πληρούνται οι ακόλουθες απαιτήσεις συστήματος:

Υπολογιστικό σύστημα βασισμένο σε επιφάνεια εργασίας ή φορητό

Επεξεργαστής Intel(R) Celeron(R), Pentium(R) II, Pentium(R) III ή Pentium(R) 4

Chipset Σειράς 800 της Intel

Τουλάχιστον 32 ΜΒ φυσική μνήμη

Σκληρός δίσκος IDE

Microsoft* Windows* 98, Windows* 98 Second Edition (SE), Windows* Millennium Edition (Me), Windows* NT 4.0 (Service Pack 3.0 και νεότερο) Windows* 2000 Professional, Windows* XP Home Edition ή Windows XP Professional.

Λειτουργικά συστήματα που δεν υποστηρίζονται:

Οποιαδήποτε έκδοση των Microsoft* Windows* 3.1

Οποιαδήποτε έκδοση των Microsoft* Windows* 95

Οποιαδήποτε έκδοση (μαζί με το service pack) των Microsoft* Windows* NT 3.51

Microsoft* Windows* 2000 Server, Windows* 2000 Advanced Server και Windows* 2000 Data Center Server

Microsoft* Windows* XP Server, Windows* XP Advanced Server και Windows* XP Data Center Server

Linux*

UNIX*

BeOS*

MacOS*

OS/2* (οποιαδήποτε έκδοση)

MS-DOS*

*  λοιπά εμπορικά σήματα και επωνυμίες ενδέχεται να διεκδικηθούν ως ιδιοκτησία τρίτων.


Γενικά χαρακτηριστικά:
Βοήθεια για το Intel(R) Application Accelerator

Γενικά χαρακτηριστικά:

Το Intel(R) Application Accelerator διαθέτει τα ακόλουθα χαρακτηριστικά στις σελίδες ιδιοτήτων:

Πληροφορίες Συσκευής - Αυτή η σελίδα ιδιοτήτων, η οποία διατίθεται για όλες τις ρυθμίσεις συστήματος που ταιριάζουν, προβάλλει πληροφορίες που παράγονται και μεταφέρονται από το στοιχείο Intel(R) Application Accelerator Driver. Εμφανίζονται διάφορες παράμετροι που παρέχουν πληροφορίες σχετικά με τη(ις) μονάδα(ες) δίσκου IDE, τις ταχύτητες μεταφοράς και τις εκδόσεις ελεγκτή του υπολογιστή.

Αναφορά - Αυτή η σελίδα ιδιοτήτων, η οποία διατίθεται για όλα τα κριτήρια συστήματος που ταιριάζουν, προβάλλει μια αναφορά, για λόγους υποστήριξης, σχετικά με πληροφορίες που αφορούν τον ελεγκτή IDE, το κανάλι IDE και τη(ις) μονάδα(ες) δίσκου IDE. Η αναφορά αυτή μπορεί επίσης να εκτυπωθεί, να αποθηκευτεί ως αρχείο κειμένου και να προβληθεί από εξωτερικό πρόγραμμα προβολής.

Υποστήριξη - Αυτή η σελίδα ιδιοτήτων, η οποία διατίθεται για όλα τα κριτήρια συστήματος που ταιριάζουν, προβάλλει πληροφορίες υποστήριξης, όπως τοποθεσίες υποστήριξης στο Web και διάφορα κείμενα συμβολοσειρών για πληροφορίες, καθώς και άλλες πληροφορίες που αφορούν την υποστήριξη του προϊόντος.

*  λοιπά εμπορικά σήματα και επωνυμίες ενδέχεται να διεκδικηθούν ως ιδιοκτησία τρίτων.


Περιγραφή στοιχείου: Intel(R) Application Accelerator Driver
Βοήθεια για το Intel(R) Application Accelerator

Περιγραφή στοιχείου: Intel(R) Application Accelerator Driver

Η τεχνολογία Intel(R) Application Accelerator αποτελεί ένα στοιχείο πιστοποιημένο από τα Εργαστήρια Ποιότητας Υλικού των Windows* <http://www.microsoft.com/hwtest/default.asp> (WHQL) που σχεδιάστηκε με σκοπό να αυξάνει την ταχύτητα του υποσυστήματος δίσκος προς σύστημα.

Το Intel(R) Application Accelerator έχει τη δυνατότητα να θέτει ερώτημα στο στοιχείο αποθήκευσης μέσω μιας διασύνδεσης IOCTL και να λαμβάνει λεπτομερείς πληροφορίες για τον ελεγκτή Ultra ATA και για τη συσκευή, οι οποίες προβάλλονται στη σελίδα ιδιοτήτων Πληροφορίες συσκευής και μπορούν να αποθηκευτούν και να προβληθούν στη σελίδα ιδιοτήτων Αναφορά.

Επιπρόσθετα, μια λειτουργία ανανέωσης μπορεί να χρησιμοποιηθεί για την ανανέωση της σελίδας ιδιοτήτων Πληροφορίες συσκευής όταν γίνεται μετάθεση συσκευών κάτω από φορητές ρυθμίσεις παραμέτρων. Η λειτουργία ανανέωσης μπορεί να ενεργοποιηθεί πατώντας το πλήκτρο "F5" ή από το μενού "Προβολή" και μετά επιλέγοντας "Ανανέωση F5".

*  λοιπά εμπορικά σήματα και επωνυμίες ενδέχεται να διεκδικηθούν ως ιδιοκτησία τρίτων.


Περιγραφή στοιχείου Εμφάνιση πληροφοριών ελεγκτή και συσκευής
Βοήθεια για το Intel(R) Application Accelerator

Περιγραφή στοιχείου: Εμφάνιση πληροφοριών ελεγκτή και συσκευής

Όταν είναι ανοικτό, το παράθυρο Συσκευές της σελίδας ιδιοτήτων Πληροφορίες συσκευής περιέχει καταχωρήσεις για τον ελεγκτή Intel(R) Ultra ATA και για όλες τις συνδεδεμένες συσκευές ATA/ATAPI. Με την επιλογή ενός συγκεκριμένου ελεγκτή ή συσκευής στο παράθυρο Συσκευές, η εφαρμογή προβάλλει τις αντίστοιχες παραμέτρους ρύθμισης στο παράθυρο Πληροφορίες συσκευής. Οι παράμετροι που εμφανίζονται με εικονίδιο παλμογράφου είναι μόνο για ανάγνωση, ενώ οι παράμετροι που εμφανίζονται με εικονίδιο γαλλικού κλειδιού είναι για ανάγνωση και εγγραφή. Οι διάφορες παράμετροι περιγράφονται στην επόμενη οθόνη:

Παράμετροι ελεγκτή:

Όνομα	Περιγραφή
Έγινε εγκατάσταση του κιτ αποθήκευσης	Έκδοση προϊόντος Intel® Application Accelerator
Έκδοση προγράμματος οδήγησης	Η έκδοση του προγράμματος οδήγησης της συσκευής
Δόμηση VxD (1)	Το όνομα προϊόντος του προγράμματος οδήγησης της συσκευής VSD
Έκδοση VxD (1)	Η έκδοση του προγράμματος οδήγησης της συσκευής VSD
Υποστήριξη κατάστασης λειτουργίας ΡΙΟ	Οι καταστάσεις λειτουργίας ΡΙΟ που υποστηρίζονται από τον ελεγκτή
Υποστήριξη κατάστασης λειτουργίας DMA SW	Οι καταστάσεις λειτουργίας DMA απλής λέξης που υποστηρίζονται από τον ελεγκτή
Υποστήριξη κατάστασης λειτουργίας DMA ΜW	Οι καταστάσεις λειτουργίας DMA πολλαπλών λέξεων που υποστηρίζονται από τον ελεγκτή
Υποστήριξη κατάστασης λειτουργίας UDMA	Οι καταστάσεις λειτουργίας Ultra DMA που υποστηρίζονται από τον ελεγκτή

Παράμετροι συσκευής:

Όνομα	Περιγραφή
Υλικολογισμικό	Η επανέκδοση του υλικολογισμικού της συσκευής
Αριθμός σειράς	Ο αριθμός σειράς της συσκευής
Υποστήριξη κατάστασης λειτουργίας ΡΙΟ	Οι καταστάσεις λειτουργίας ΡΙΟ που υποστηρίζονται από τη συσκευή
Υποστήριξη κατάστασης λειτουργίας DMA SW	Οι καταστάσεις λειτουργίας DMA μίας λέξης που υποστηρίζονται από τη συσκευή
Υποστήριξη κατάστασης λειτουργίας DMA ΜW	Οι καταστάσεις λειτουργίας DMA πολλαπλών λέξεων που υποστηρίζονται από τη συσκευή
Υποστήριξη κατάστασης λειτουργίας UDMA	Οι καταστάσεις λειτουργίας DMA που υποστηρίζονται από τη συσκευή
Μέγεθος δίσκου (2)	Συνολικό μέγεθος δίσκου
Τρέχουσα κατάσταση λειτουργίας μεταφοράς	Η τρέχουσα ρυθμισμένη κατάσταση λειτουργίας μεταφοράς της συσκευής
Όριο κατάστασης λειτουργίας μεταφοράς	Χρησιμοποιείται για να περιορίζει την τρέχουσα κατάσταση λειτουργίας μεταφοράς και ισχύει για κάθε συσκευή που είναι συνδεδεμένη σε αυτή τη θέση καλωδίου
Τύπος καλωδίου (Υπολογιστής υπηρεσίας)	Αναφέρει αν το BIOS συστήματος αναγνωρίσει ότι η συσκευή είναι συνδεδεμένη με καλώδιο ΑΤΑ αγωγού 40 ή 80
Διαχείριση αυτόματης ακουστικής	Ελέγχει τη στάθμη θορύβου που σχετίζεται με τη μονάδα
Δυναμικό APM σε εναλλασσόμενο ρεύμα	Ελέγχει τη δυνατότητα του σκληρού δίσκου να διαχειρίζεται τα δικά του επίπεδα ισχύος όταν τροφοδοτείται με εναλλασσόμενο ρεύμα (π.χ. το σύστημα είναι συνδεδεμένο σε μια κοινή ηλεκτρική πρίζα).
Δυναμικό APM σε μπαταρία	Ελέγχει τη δυνατότητα του σκληρού δίσκου να διαχειρίζεται τα δικά του επίπεδα ισχύος όταν τροφοδοτείται με μπαταρία.
(1) Η παράμετρος αυτή εμφανίζεται μόνο στα Microsoft* Windows* 98, Windows 98 Second Edition (SE), και Windows Millennium Edition (Me).

(2) Η παράμετρος αυτή εμφανίζεται μόνο σε συσκευές που πληρούν την προδιαγραφή ATA.


Παράμετροι τροποποιήσιμοι από το χρήστη
Βοήθεια για το Intel(R) Application Accelerator

Παράμετροι τροποποιήσιμοι από το χρήστη

Στο παράθυρο Παράμετροι στη σελίδα ιδιοτήτων Πληροφορίες συσκευής υπάρχουν ορισμένες παράμετροι που μπορούν να τροποποιηθούν. Για να αλλάξετε μια επιλεγμένη παράμετρος, επιλέξτε τη συσκευή που θέλετε να τροποποιήσετε από το παράθυρο Συσκευές. Οι αντίστοιχες παράμετροι που διαθέτονται θα εμφανιστούν στο παράθυρο Παράμετροι, στα δεξιά.

Κάντε διπλό κλικ στο εικονίδιο του γκρι κλειδιού που σχετίζεται με την τροποποιήσιμη παράμετρο. Θα εμφανιστεί το παράθυρο διαλόγου “Επεξεργασία τιμής”. Κάντε κλικ στο κάτω βέλος κύλισης και κάντε την επιθυμητή επιλογή.

Θα πρέπει να γίνει επανεκκίνηση του συστήματος, αν τροποποιηθεί το 'Όριο κατάστασης μεταφοράς'.

Παράμετροι με δυνατότητα τροποποίησης:

Όριο κατάστασης μεταφοράς

PIO-0, PIO-2, PIO-3, PIO-4

Προγραμματιζόμενη Είσοδος/Έξοδος (PIO) – Ρυθμός μεταφοράς για παλιότερες συσκευές.

DMA MW-1, DMA MW-2

DMA Multi-Word (MW) – Ρυθμός μεταφοράς για παλιότερες συσκευές.

UDMA-0, UDMA-1, UDMA-2, UDMA-3, UDMA-4, UDMA-5

Ultra DMA (UDMA) – Ρυθμός μεταφοράς για τρέχουσες συσκευές. Το UDMA-5 είναι ισοδύναμο με το ATA-100.

Κανένα όριο

Επιτρέπει την ταχύτερη κατάσταση μεταφοράς που υποστηρίζεται από τη συσκευή.

Διαχείριση αυτόματης ακουστικής (1)

Μέγιστη απόδοση

Η καλύτερη απόδοση μονάδας με ενεργοποιημένη τη διαχείριση αυτόματης ακουστικής.

Προεπιλογή του κατασκευαστή, [τιμή]

Οι ρυθμίσεις που συνιστά ο κατασκευαστής για τη βέλτιστη στάθμη θορύβου. Ο κατασκευαστής της συσκευής ενδεχομένως να μην παρέχει μια προεπιλεγμένη τιμή.

Ελάχιστη έξοδος ακουστικής

Η ελάχιστη ακουστή στάθμη θορύβου.

Απενεργοποιημένο

Η καλύτερη απόδοση μονάδας χωρίς να είναι ενεργοποιημένη η διαχείριση αυτόματης ακουστικής. Αυτή η επιλογή είναι πιο γρήγορη από την επιλογή 'Μέγιστη απόδοση'.

Δυναμική προηγμένη διαχείριση ισχύος (APM) σε εναλλασσόμενο ρεύμα

Μέγιστη απόδοση

Η καλύτερη απόδοση μονάδας με ενεργοποιημένη τη δυναμική προηγμένη διαχείριση ισχύος (APM) όταν το σύστημα τροφοδοτείται με εναλλασσόμενο ρεύμα (π.χ. το σύστημα είναι συνδεδεμένο σε μια κοινή ηλεκτρική πρίζα).

Ελάχιστη κατανάλωση ισχύος χωρίς αναμονή

Όπως περιγράφεται.

Ελάχιστη κατανάλωση ισχύος με αναμονή

Όπως περιγράφεται.

Απενεργοποιημένο

Η καλύτερη απόδοση μονάδας χωρίς να είναι ενεργοποιημένη η δυναμική προηγμένη διαχείριση ισχύος (APM) όταν το σύστημα τροφοδοτείται με εναλλασσόμενο ρεύμα. Αυτή η επιλογή είναι πιο γρήγορη από την επιλογή 'Μέγιστη απόδοση'.

Δυναμική προηγμένη διαχείριση ισχύος (APM) σε μπαταρία

Μέγιστη απόδοση

Η καλύτερη απόδοση μονάδας με ενεργοποιημένη τη δυναμική προηγμένη διαχείριση ισχύος (APM) όταν το σύστημα τροφοδοτείται με μπαταρία.

Ελάχιστη κατανάλωση ισχύος χωρίς αναμονή

Όπως περιγράφεται

Ελάχιστη κατανάλωση ισχύος με αναμονή

Όπως περιγράφεται

Απενεργοποιημένο

Η καλύτερη απόδοση μονάδας χωρίς να είναι ενεργοποιημένη η δυναμική προηγμένη διαχείριση ισχύος (APM) όταν το σύστημα τροφοδοτείται με εναλλασσόμενο ρεύμα. Αυτή η επιλογή είναι πιο γρήγορη από την επιλογή 'Μέγιστη απόδοση'.

(1) Η μείωση της στάθμης θορύβου της συσκευή επιτυγχάνεται με μείωση των ρυθμών αναζήτησης, πράγμα το οποίο ενδεχομένως να προκαλέσει μικρή υποβάθμιση της απόδοσης.