Przegląd
Pomoc programu Intel(R) Application Accelerator

Przegląd

Intel(R) Application Accelerator to pakiet oprogramowania dla komputerów typu desktop zaprojektowany specjalnie z myślą o zwiększeniu wydajności aplikacji i systemów komputerowych wyposażonych w procesor Intel(R) Pentium(R) III lub Pentium(R) 4. Podniesienie wydajności osiąga się przy użyciu kilku metod:

1.	Intel(R) Application Accelerator Driver - Technologia ta zwiększa prędkość przesyłania danych na wyjściu i wejściu podsystemu, znacznie przyśpieszając pracę całego systemu.

2.	Intel(R) Advanced Pre-Fetch Moduł – Dzięki tej technologii, dostępnej dla systemów opartych na procesorze Pentium(R) 4 pracujących jedynie w środowisku Microsoft* Windows* 2000 Professional i Windows XP, osiągana jest ogólna dodatkowa wydajność aplikacji pracujących w systemie Windows 2000 i Windows XP.

Instalacja oprogramowania jest elastyczna i w pełni automatyczna w systemach operacyjnych Microsoft* Windows* 98, Windows 98 Second Edition (SE), Windows Millennium Edition (Me), Windows NT* 4.0, Windows 2000 Professional oraz Windows XP Home Edition i Professional.

*  inne marki i nazwy mogą być własnością osób trzecich.


Wymagania systemowe
Pomoc programu Intel(R) Application Accelerator

Wymagania systemowe

Aby uruchomić program Intel(R) Application Accelerator, muszą być spełnione następujące wymagania systemowe:

System komputera typu desktop lub przenośnego

Procesor Intel(R) Celeron(R), Pentium(R) II , Pentium(R) III lub Pentium(R) 4

Mikroukład serii Intel 800

Minimum 32 MB fizycznej pamięci

Dysk twardy IDE

Microsoft* Windows* 98, Windows 98 Second Edition (SE), Windows Millennium Edition (Me), Windows NT*4.0 (Service Pack 3.0 lub wyższa wersja), Windows 2000 Professional, Windows XP Home Edition lub Windows XP Professional.

Nieobsługiwane systemy operacyjne:

Wszystkie wersje Microsoft Windows 3.1

Wszystkie wersje Microsoft Windows 95

Wszystkie wersje (w tym pakiet serwisowy) Microsoft Windows NT 3.51

Microsoft Windows 2000 Server, Windows 2000 Advanced Server oraz Windows 2000 Data center Server

Microsoft Windows XP Server, Windows XP Advanced Server oraz Windows XP Data center Server

Linux*

UNIX*

BeOS*

MacOS*

OS/2* (wszystkie wersje)

MS-DOS*

*  inne marki i nazwy mogą być własnością osób trzecich.


Ogólne funkcje
Pomoc programu Intel(R) Application Accelerator

Ogólne funkcje

Intel(R) Application Accelerator udostępnia następujące funkcje na poszczególnych stronach właściwości:

Informacje o urządzeniu - Ta strona właściwości, dostępna dla wszystkich pasujących konfiguracji systemowych, zawiera informacje generowane i przekazywane ze składnika Intel(R) Application Accelerator Driver.  Wyświetlane są różne parametry, w tym informacje o napędzie/napędach IDE zainstalowanym w komputerze, prędkościach przesyłania danych oraz wersji kontrolera.

Raport - Ta strona właściwości, dostępna dla wszystkich systemów spełniających przedstawione kryteria, w ramach pomocy wyświetla raporty zawierające informacje dotyczące kontrolera IDE, kanału IDE oraz napędu/napędów IDE. Raport można wydrukować, zapisać jako plik tekstowy lub przejrzeć w zewnętrznej przeglądarce.

Pomoc - Ta strona właściwości, dostępna dla wszystkich systemów spełniających przedstawione kryteria, wyświetla informacje dotyczące dostępnego wsparcia technicznego, takie jak witryny WWW z pomocą techniczną oraz różne informacyjne ciągi znaków tekstowych, a także wszelkie inne dane związane ze wsparciem technicznym produktu.

*  inne marki i nazwy mogą być własnością osób trzecich.


Przegląd składników: Intel Application Accelerator Driver
Pomoc programu Intel(R) Application Accelerator

Przegląd składników:  Intel(R) Application Accelerator Driver

Intel(R) Application Accelerator Driver Technology to składnik programu certyfikowany przez Windows* Hardware Quality Labs <http://www.microsoft.com/hwtest/default.asp> (WHQL) opracowany specjalnie z myślą o zwiększeniu prędkości transmisji z dysku do podsystemu systemu.

Intel(R) Application Accelerator oferuje możliwość wyszukiwania składnika pamięci przez interfejs IOCTL oraz uzyskania szczegółowych informacji o kontrolerze Ultra ATA i urządzeniu, wyświetlanych na stronie właściwości Informacje o urządzeniu, które można zapisać w pliku i wyświetlić na stronie właściwości Raport.

Ponadto, w przypadku zamiany urządzeń w mobilnych konfiguracjach, do odświeżenia strony właściwości Informacje o urządzeniu można użyć funkcji odświeżania. Funkcję odświeżania można uaktywnić, naciskając klawisz funkcyjny ‘F5’ lub klikając na menu ‘Widok’, a następnie wybierając ‘Odśwież’.

*  inne marki i nazwy mogą być własnością osób trzecich.


Przegląd składników:  Wyświetlanie informacji o kontrolerze i urządzeniu
Pomoc programu Intel(R) Application Accelerator

Przegląd składników:  Wyświetlanie informacji o kontrolerze i urządzeniu

Po otworzeniu okna ‘Urządzenia’ na stronie właściwości Informacje o urządzeniu zostaną wyświetlone wpisy dla kontrolera Intel(R) Ultra ATA i wszystkie podłączone urządzenia ATA/ATAPI. Wybór konkretnego kontrolera lub urządzenia w oknie ‘Urządzenia’ spowoduje wyświetlenie przez aplikację odpowiadających mu parametrów konfiguracyjnych w oknie ‘Informacje o urządzeniu’. Parametry wyświetlane z ikoną oscyloskopu są tylko do odczytu, natomiast parametry wyświetlane z ikoną klucza są do odczytu i zapisu.  Różne parametry opisano poniżej na następnym ekranie:

Parametry kontrolera:

Nazwa	Opis
Zainstalowany zestaw pamięci	Wersja produktu Intel(R) Application Accelerator
Wersja sterownika	Wersja sterownika urządzenia
Kompilacja VxD (1)	Nazwa handlowa sterownika urządzenia VSD
Wersja VxD (1)	Wersja sterownika urządzenia VSD
Obsługa trybu PIO	Tryby PIO obsługiwane przez kontroler
Obsługa trybu DMA SW	Tryby DMA jednosłowowe obsługiwane przez kontroler
Obsługa trybu DMA MW	Tryby DMA wielosłowowe obsługiwane przez kontroler
Obsługa trybu UDMA	Tryby Ultra DMA obsługiwane przez kontroler

Parametry urządzenia:

Nazwa	Opis
Oprogramowanie układowe	Wersja oprogramowania sprzętowego urządzenia
Numer seryjny	Numer seryjny urządzenia
Obsługa trybu PIO	Tryby PIO obsługiwane przez urządzenie
Obsługa trybu DMA SW	Tryby DMA jednosłowowe obsługiwane przez urządzenie
Obsługa trybu DMA MW	Tryby DMA wielosłowowe obsługiwane przez urządzenie
Obsługa trybu UDMA	Tryby Ultra DMA obsługiwane przez urządzenie
Pojemność dysku (2)	Całkowita pojemność dysku
Bieżący tryb transferu	Bieżący skonfigurowany tryb transferu urządzenia
Limit trybu transferu	Służy do ograniczenia bieżącego trybu transferu i dotyczy dowolnego urządzenia podłączonego do tej pozycji kabla
Typ kabla (host)	Wysyła raport, gdy BIOS rozpozna, że urządzenie jest podłączone przez kabel ATA 40- lub 80-żyłowy
Automatyczne zarządzanie akustyczne	Steruje poziomem hałasu związanym z pracą dysku
Dynamiczne APM przy zasilaniu sieciowym	Steruje zdolnością dysku twardego do zarządzania własnymi poziomami poboru energii przy zasilaniu sieciowym (tzn. system podłączony do gniazdka ściennego)
Dynamiczne APM przy zasilaniu z baterii	Steruje zdolnością dysku twardego do zarządzania własnymi poziomami poboru energii przy zasilaniu z baterii
(1) Ten parametr pojawia się tylko w Microsoft* Windows* 98, Windows 98 Second Edition (SE) oraz Windows Millennium Edition (Me).

(2) Ten parametr pojawia się tylko dla urządzeń spełniających specyfikację ATA.


Parametry modyfikowalne przez użytkownika
Pomoc programu Intel(R) Application Accelerator

Parametry modyfikowalne przez użytkownika

W oknie ‘Parametry’ na stronie właściwości Informacje o urządzeniu znajdują się pewne parametry, które można modyfikować. Aby zmienić wybrany parametr, w oknie ‘Urządzenia’ należy wybrać urządzenie, którego parametr ma zostać zmodyfikowany. Odpowiadające mu dostępne parametry zostaną wyświetlone z prawej strony w oknie ‘Parametry’.

Kliknąć podwójnie lewym przyciskiem myszy na szarą ikonę klucza towarzyszącą danemu parametrowi. Na ekranie pojawi się okno dialogowe ‘Edycja wartości’. Kliknij na strzałkę przewijania do dołu i wybierz żądaną opcję.

W przypadku modyfikacji parametru ‘Limit trybu transferu’ system należy uruchomić ponownie.

Parametry modyfikowalne

Limit trybu transferu

PIO-0, PIO-2, PIO-3, PIO-4

Programowane wejście/wyjście (PIO) – Szybkość transferu danych dla starszych urządzeń

DMA MW-1, DMA MW-2

Tryb wielosłowowy DMA (MW) – Szybkość transferu danych dla starszych urządzeń

UDMA-0, UDMA-1, UDMA-2, UDMA-3, UDMA-4, UDMA-5

Ultra DMA (UDMA) – Szybkość transferu danych dla bieżących urządzeń. UDMA-5 jest odpowiednikiem ATA-100

Brak limitu

Uruchamia najszybszy tryb transferu danych obsługiwany przez urządzenie

Automatyczne zarządzanie akustyczne (1)

Maksymalna wydajność

Włączona najlepsza wydajność napędu z automatycznym zarządzaniem akustycznym

Ustawienia domyślne producenta, [wartość]

Ustawienia zalecane przez producenta dla uzyskania optymalnego poziomu hałasu. Producent urządzenia może nie podać wartości domyślnej

Minimalny wyjściowy poziom akustyczny

Minimalny poziom słyszalnego hałasu

Wyłączone

Najlepsza wydajność napędu bez włączonego automatycznego zarządzania akustycznego. Ta opcja pozwala na szybszą pracę niż opcja ‘Maksymalna wydajność’

Dynamiczne APM przy zasilaniu sieciowym

Maksymalna wydajność

Najlepsza wydajność napędu przy włączonym dynamicznym APM, gdy system jest zasilany z sieci (tzn. system jest podłączony do gniazdka ściennego).

Minimalny pobór mocy bez przerw

Według opisu

Minimalny pobór mocy z przerwami

Według opisu

Wyłączone

Najlepsza wydajność napędu bez włączonego dynamicznego APM przy zasilaniu sieciowym. Ta opcja pozwala na szybszą pracę niż opcja ‘Maksymalna wydajność’

Dynamiczne APM przy zasilaniu z baterii

Maksymalna wydajność

Najlepsza wydajność napędu przy włączonym dynamicznym APM, gdy system jest zasilany z baterii.

Minimalny pobór mocy bez przerw

Według opisu

Minimalny pobór mocy z przerwami

Według opisu

Wyłączone

Najlepsza wydajność napędu bez włączonego dynamicznego APM przy zasilaniu z baterii. Ta opcja pozwala na szybszą pracę niż opcja ‘Maksymalna wydajność’

(1) Zmniejszanie poziomu hałasu urządzenia uzyskuje się przez redukcję czasów przeszukiwania, co może spowodować niewielki spadek wydajności.