Main Window
User's Guide

Dear users! The given manual contains all indispensable items of information indispensable for maintenance of the program, therefore before usage of the program it is recommended to acquaint with datas by a manual to avoid possible errors.


Introduction

CPU Hi-t Professional Edition v.2.0 is a special program for testing of the central processing unit of the PC for repeatability of operation at %100 -s' load. The program includes 4 main tests, and 1 padding test. The flexible set-up of a load capacity allows more effectively to customize the tests of the program. The program has the modern, intuitively clear interface and supports two languages of the interface - Russian and English.


Installation

For installation of the program it is necessary to start the file CPUPE.exe. It is the distribution kit of the program. After start of the file follow to the instructions of the installation program.

If necessary (absence of some system files) download the distribution kit DllPack.exe from an official site AG FreeSoft.


Start

For start of the program CPU Hi-t Professional Edition v.2.0 select the appropriate choice Start.

Start --> Programs --> AG FreeSoft Programs --> CPU Hi-t Professional Edition --> CPU Hi-t Professional Edition v.2.0


Main Window
Interface description

After start of the program to appear the main window of the program.

In a top of the program to be the menu of the program, under it the panel of testing, then information window allocates.

Menu Description.

1.0 Menu File

1.1 Reset results - command of reset of results and resetting of the interface in a reset state.

1.2 Program settings - procedure call of the window of customizations of the program.

1.3 Tests settings - procedure call of the window of customizations of the tests.

1.4 Exit - command of an exit.

2.0 Menu Help

2.1 User's Guide - procedure call of the user's guide.

2.2 Visit to web-site - command for visit of a web-site AG FreeSoft.

2.3 Send e-maill - command of a dispatch of the electronic letter AG FreeSoft.

2.4 About - command of output of the items of information about the developer.

Test-panel description

Buttons Start test - fulfil start of the appropriate tests.

Buttons Stop test - fulfil a stopping of the appropriate tests.

Indicator Status of the test - displays a degree of execution of the appropriate test in percentage.

Central processing unit usage - level meters of load and usage of the central processing unit.

Information window - maps operations of the user

Window Program setting description

Checkbox (Russian language) Ðóññêèé ÿçûê  - is intended for installation of Russian.

Checkbox  (English language) Àíãëèéñêèé ÿçûê - is intended for installation of the English language.

Flag Disable splash-screen at start - fulfils disconnecting / inclusion of a picture.

Button OK - fulfils installation of the language for all program.

Button Cancel - closes the window of Program settings.

Window Tests settings description

Scroll-boxes 1-5 - are intended for installation of a load capacity (position of a scroll box defines value of a load capacity in percentage). The mean levels of load are by default advanced.

Button OK - fulfils installation of the language for all program.

Button Cancel - closes the window of Tests settings.


Exit
 Testing

How to begin testing, place termination parameters. For this purpose fulfil a left-click till the menu the File, from the opened list select Tests settings. Then from the opened window select a demanded load capacity, having moved a scroll box of the appropriate test on the necessary position. To begin testing, fulfil a left-click on the button Start test in the window of the appropriate test. After that the program will begin execution of the test according to a load capacity. After completion of the test the program will produce the message in the information window. If you want to interrupt the test, push the button Stop test.

It is recommended to use a control program temperature of the central processing unit (for example, program MotherBoard Monitor).

Please, disable screensaver for the period of testing! It is necessary for correct operation of tests.


Open
Reset results

To reset results and to return the interface of the program in a reset state, left click till the menu the File, from the opened menu select the command Reset results. The command will return the interface in a reset state.


Print
Exit

To leave from the program, left click till the menu the File, from the opened menu select the command an Exit (or push the button of closing of the window).


Exit
Program settings

To change of program settings, left click till the menu the File, from the opened menu select the command Program settings. After that the window of customizations will open. If you want to replace the language of the interface, place the appropriate switch Russian or English language. If you want to disable show a splash-screen at start of the program, select check box Disable splash-screen at start.


Algoritm
Definition of repeatability

After you fulfil all tests offered the program, you should define repeatability. During testing there is a strong heating of the processor (depending from a load capacity).

1. If after testing the computer works without changes, the failures in operation miss, it testifies to a stable operation of the processor. For the greater efficiency it is recommended after the tests to work with graphics packages, systems of encoding or archivers. If all these programs work without changes, the central processing unit of your PC works stably.

2. If after testing the computer began to work with failures, the negative changes in its operation (are appreciable specially by operation from the graphics package, systems of encoding or archivers), it testifies to unstable operation of the central processing unit. It is in this case recommended to improve cooling of the central processing unit, or to reduce frequency of its operation.


Feedback

AG FreeSoft continuously perfects and meliorates the software products. Therefore, if you have detected any errors in software products, if you had sentences on improvement of software products, immediately inform us it through the e-mail. It will promote development of our software products and improvement of their quality.

Addresses for link:

On any problems concerning maintenance of software products - ag_support@fromru.com

On beta testing (and cooperation) - agfreesoft@fromru.com

You also can visit our site to the address http://agfreesoft.privathost.ru and download the last versions of software products