Yleiskatsaus
Intel(R) Application Accelerator Ohje

Yleiskatsaus

Intel(R) Application Accelerator on työpöytäpohjainen ohjelmistopaketti, joka on erityisesti tarkoitettu lisäämään Intel(R) Pentium(R) III- tai Pentium(R) 4 -suorittimia käyttävien ohjelmien ja tietokonejärjestelmien suorituskykyä. Tämä saavutetaan useita eri menetelmiä käyttäen:

1.	Intel(R) Application Accelerator -ohjain - Tällä tekniikalla lisätään I/O-alijärjestelmän siirtonopeutta, joka tehostaa suuresti järjestelmän nopeutta.

2.	Intel(R) Advanced Pre-Fetch -moduuli - Tällä tekniikalla, joka on käytettävissä vain Pentium(R) 4 -suoritinpohjaisissa Microsoft* Windows* 2000 Professional- ja Windows XP-järjestelmissä, saavutetaan lisäksi yleisen suorituskyvyn parannus Windows 2000- ja Windows XP -pohjaisissa sovelluksissa.

Ohjelmiston asennus on joustavaa ja täysin automaattista Microsoft* Windows* 98-, Windows 98 Second Edition (SE)-, Windows Millennium Edition* (Me)-, Windows NT* 4.0-, Windows 2000 Professional- ja Windows XP Home Edition- sekä Professional- käyttöjärjestelmissä.

*  muut merkit ja nimet voivat olla muiden omaisuutta.


Järjestelmävaatimukset
Intel(R) Application Accelerator Ohje

Järjestelmävaatimukset:

Intel(R) Application Accelerator -ohjelman käytön järjestelmävaatimukset:

Työpöytäpohjainen tai kannettava tietokonejärjestelmä

Intel(R) Pentium(R) III- tai Pentium(R) 4 -suoritin

Intel 800-Series -piirisarja

Vähintään 32 Mt fyysistä muistia

IDE-kiintolevy

Microsoft* Windows* 98, Windows 98 Second Edition (SE), Windows Millennium Edition (Me), Windows NT* 4.0 (Service Pack 3.0 ja uudempi), Windows 2000 Professional ja Windows XP Home Edition sekä Windows XP Professional.

Seuraavia käyttöjärjestelmiä ei tueta:

Microsoft Windows 3.1:n versioita

Microsoft Windows 95:n versioita

Microsoft Windows NT 3.51:n versioita (mukaan lukien service pack)

Microsoft Windows 2000 Server, Windows 2000 Advanced Server ja Windows 2000 Data center Server

Microsoft Windows XP Server, Windows XP Advanced Server ja Windows XP Data center Server

Linux*

UNIX*

BeOS*

MacOS*

OS/2* (ei mitään versiota)

MS-DOS

* muut merkit ja nimet voivat olla muiden omaisuutta.


Yleisominaisuudet
Intel(R) Application Accelerator Ohje

Yleisominaisuudet:

Intel(R) Application Accelerator sisältää seuraavat ominaisuudet, jotka ovat käytettävissä ominaisuussivuilta:

Laitetiedot - Tämä ominaisuussivu, joka on käytettävissä kaikissa yhteensopivissa järjestelmäkokoonpanoissa, näyttää Intel(R) Application Accelerator -ohjainkomponentin luomat ja lähettämät tiedot. Eri parametrit antavat tietoja tietokoneen IDE-asemasta/asemista, siirtonopeuksista ja ohjainversioista.

Raportti - Tämä ominaisuussivu, joka on käytettävissä kaikissa yhteensopivissa järjestelmissä, näyttää raportin tukitoimia varten IDE-ohjaimesta, IDE-kanavasta ja IDE-asemasta/asemista. Tämä raportti voidaan tulostaa, tallentaa tekstitiedostona, ja näyttää ulkoisessa katseluohjelmassa.

Tuki - Tämä ominaisuussivu, joka on käytettävissä kaikissa yhteensopivissa järjestelmissä, näyttää tukitietoja kuten web-tukisivut ja monia muita tekstitietoja ja tuotteen tukea koskevia tietoja.

* muut merkit ja nimet voivat olla muiden omaisuutta.


Komponentin yleiskatsaus: Intel Application Accelerator -ohjainteknologia
Intel(R) Application Accelerator Ohje

Komponentin yleiskatsaus:  Intel(R) Application Accelerator -ohjain

Intel(R) Application Accelerator -ohjainkomponentti on Windows* Hardware Quality Labs <http://www.microsoft.com/hwtest/default.asp> (WHQL) -sertifioitu komponentti, joka on erityisesti tarkoitettu lisäämään alijärjestelmän levyltä-järjestelmään-nopeutta.

Intel(R) Application Accelerator pystyy lähettämään kyselyn tallennuskomponentille IOCTL-liittymän kautta ja saamaan tarkkoja Ultra ATA -ohjaimen ja laitteen tietoja, jotka näkyvät Laitetiedot-ominaisuussivulla. Tiedot voidaan tallentaa tiedostoon ja näyttää Raportti-ominaisuussivulla.

Lisäksi Laitetiedot-ominaisuussivun voi päivittää, kun vaihdetaan laitteita kannettavissa kokoonpanoissa. Päivityksen voi tehdä joko painamalla "F5"-toimintonäppäintä tai valitsemalla "Näytä"-valikossa "Päivitä F5".

* muut merkit ja nimet voivat olla muiden omaisuutta.


Komponentin yleiskatsaus: Ohjain- ja laitetietojen esittäminen
Intel(R) Application Accelerator Ohje

Komponentin yleiskatsaus:  Ohjain- ja laitetietojen esittäminen

Kun Laitteet-ikkuna avataan, Laitetiedot-ominaisuussivulla on merkintöjä Intel(R) Ultra ATA -ohjaimelle ja kaikille liitetyille ATA/ATAPI-laitteille. Kun valitaan tietty ohjain tai laite Laitteet-ikkunasta, sovellus esittää näytössä vastaavat Laitetiedot-ikkunan kokoonpanoparametrit. Oskilloskooppi-kuvakkeella varustetut parametrit ovat vain luku -parametreja, kun taas jakoavain-kuvakkeella varustetut parametrit ovat luku-kirjoitusparametreja. Parametrien kuvaukset esitetään seuraavassa näytössä.

Ohjainparametrit:

Nimi	Kuvaus
Massamuistisarja asennettu	Intel® Application Accelerator -tuoteversio
Ohjaimen versio	Laiteohjaimen versio
VxD-koontikäännös (1)	VSD-laiteohjaimen tuotenimi
VxD-versio (1)	VSD-laiteohjaimen versio
PIO-tilan tuki	Ohjaimen tukemat PIO-tilat
DMA SW -tilan tuki	Ohjaimen tukemat yksisanaiset DMA-tilat
DMA MW -tilan tuki	Ohjaimen tukemat monisanaiset DMA-tilat
UDMA-tilan tuki	Ohjaimen tukemat Ultra DMA -tilat
Laiteparametrit:

Nimi	Kuvaus
Laiteohjelmisto	Laitteen laiteohjelmiston versio
Sarjanro	Laitteen sarjanumero
PIO-tilan tuki	Laitteen tukemat PIO-tilat
DMA SW -tilan tuki	Laitteen tukemat yksisanaiset DMA-tilat
DMA MW -tilan tuki	Laitteen tukemat monisanaiset DMA-tilat
UDMA-tilan tuki	Laitteen tukemat Ultra DMA -tilat
Levyn koko (2)	Levyn koko
Nykyinen siirtotila	Laitteen nykyinen määritetty siirtotila
Siirtotilan raja	Käytetään rajaamaan nykyinen siirtotila, koskee kaikkia tiettyyn kaapelikohtaan kytkettyjä laitteita
Kaapelityyppi (isäntä)	Raportoi, jos järjestelmän BIOS havaitsee laitteen olevan kytkettynä 40- tai 80-napaisella ATA-kaapelilla
Automaattinen akustiikan hallinta	Säätää levyyn liittyvää äänitasoa
Laajennettu virranhallinta	Säätää levyn kykyä hallita omaa virransäästötasoa
(1) Tämä parametri tulee esiin vain käyttöjärjestelmissä Microsoft* Windows* 98, Windows 98 Second Edition (SE) ja Windows Millennium Edition (Me).

(2) Tämä parametri tulee esiin vain laitteissa, jotka täyttävät ATA-määritykset.


Käyttäjän määritettävissä olevat parametrit
Intel® Application Accelerator Ohje

Käyttäjän määritettävissä olevat parametrit

Laitetiedot-ominaisuussivun Parametrit-ikkunassa on tiettyjä käyttäjän määritettävissä olevia parametreja. Kun haluat muuttaa valittua parametria, valitse muutettava laite Laitteet-ikkunasta. Vastaavat käytettävissä olevat parametrit näkyvät Parametrit-ikkunassa oikealla.

Kaksoisnapsauta hiiren ykköspainikkeella harmaata jakoavain-kuvaketta, joka liittyy muutettavaan parametriin.  ”Muokkaa arvoa” -valintaikkuna tulee esiin. Napsauta alasvieritysnuolta ja valitse haluamasi asetus.

Jos 'Siirtotilan raja' muutetaan, järjestelmä on käynnistettävä uudelleen.

Muutettavissa olevat parametrit:

Siirtotilan raja

PIO-0, PIO-2, PIO-3, PIO-4

Ohjelmoitu I/O (PIO, Programmed Input/Output) – Siirtonopeus vanhemmille laitteille

DMA MW-1, DMA MW-2

DMA Multi-Word (MW) – Siirtonopeus vanhemmille laitteille

UDMA-0, UDMA-1, UDMA-2, UDMA-3, UDMA-4, UDMA-5

Ultra DMA (UDMA) – Siirtonopeus nykyisille laitteille. UDMA-5 vastaa ATA-100:aa

Ei rajaa

Mahdollistaa nopeimman laitteen tukeman siirtotilan

Automaattinen akustiikan hallinta (1)

Suurin suorituskyky

Paras aseman suorituskyky Automaattisen akustiikan hallinnan ollessa käytössä

Valmistajan oletus, [arvo]

Valmistajan suosittelemat asetukset optimaalista äänitasoavarten. Laitteen valmistaja ei ehkä anna oletusarvoa

Pienin akustinen tuotto

Pienin kuultava äänitaso

Pois käytöstä

Paras aseman suorituskyky ilman Automaattista akustiikan hallintaa. Tämä valinta on nopeampi kuin valinta 'Suurin suorituskyky'

Laajennettu virranhallinta

Suurin suorituskyky

Paras aseman suorituskyky Laajennetun virranhallinnan ollessa käytössä

Pienin virrankulutus ilman valmiustilaa

Kuten kuvattu

Pienin virrankulutus valmiustilalla

Kuten kuvattu

Pois käytöstä

Paras aseman suorituskyky ilman Laajennettua virranhallintaa. Tämä valinta on nopeampi kuin valinta 'Suurin suorituskyky'

(1) Laitteen äänitason pienentäminen saavutetaan pienentämällä hakunopeuksia, mikä voi aiheuttaa vähäistä suorituskyvyn huononemista.